)c (GeV/ Tp 0 1 2 3 4 5 6

-1)c (GeV/

Tpdy/d_ϕN^2d

3−10

2−10

1−10

1

10 ALICE < 4 y 2.5 <

= 2.76 TeV, 0-40% NNs Pb-Pb = 2.76 TeV, 40-90% x 3 NNs Pb-Pb = 2.76 TeV x 30 s pp

Pb-Pb corr. syst. uncert. 3.7% pp corr. syst. uncert. 3.9%